== Noteworthy SL Changes Since Last Release of SL 7 ==
NOTE: This section documents changes made to SL specific packages since
      the last SL release. +
      This section does not list changes inherited from Upstream unless
      absolutely necessary.

.SL Secure Boot Key
The boot chain for Scientific Linux 7.4 is signed with a new key. For more information please read link:#_about_uefi_secure_boot[About UEFI Secure Boot].

.OpenAFS
With SL 7.4 OpenAFS has been updated to version 1.6.21 the latest upstream stable.


// vim: set syntax=asciidoc:
